Module Name Entry (GSD Type 0)

Program Version Identification Entry

Control Section Name Entry

These are all absolute and contain

ENDGSD Data Block only definitions.

- Optional -

A zero-length CSECT with name . ABS.

Global Symbol Name Entries

ENDMOD Data Block

(GSD Type 6)

(GSD Type 1)

(GSD Type 4)