Before Block 6

After Block 6 Segment 1 Segment 1

Header Header

. . . . . . . . . . . .

Permanent 1 Permanent 1

Permanent 2 Permanent 2

Permanent 3 Permanent 3

Empty Tentative

Permanent 4 Empty

End-of-segment Permanent 4

End of block 7

End-of-segment

End of block 7