MSCP Unit

Disk Type RC25 RC25 RA80 RA80

RC25 RC25

0 1 2 3

(removable) (fixed)

(removable) (fixed)

First UDA Controller

D U H a n d l e r

Port 0

To user 20 21 Second UDA Controller

Port 1 program