System Device (SY) Source Input Device (SRC)

Monitor SWAP.SYS System device handler Input device handlers Output device handlers VMX.SYS or VM.SYS MACRO.SAV LINK.SAV PIP.SAV MONMRG.SAV SYSMAC.SML SYSGEN.BLD SYSGEN.MON SYSGEN.DEV

SYSGEN.CND SYSGEN.TBL EDTL.MLB SYSTEM.MLB

User supplied device

Appropriate system source files

Map Output Device (MAP)

Virtual Memory Device (VM)

Object Output Device (OBJ) source files

(or default storage device)

WF (MACRO work file) CF (cross-reference file)

Receives object files with OBJ file type.

Binary Output Device (BIN)

Receives built system files with SYG file type.

Receives link maps.