 INSTALLATION
 ------------

  First:

  - define your 'fixed commands' in CLE.MAC
    and update this help file CLE.HLP

  - if you don't have CLI support (or RSX V3.2)
    change the symbol CLISUP in CLE.MAC to -1


  MCR-Commands:
  ------------
  >
  >MAC CLE=CLE
  >TKB CLE/CP=CLE            (ev. with FCSRES)
  >PIP CLE.OBJ;*/DE
  >
  >PIP all:[*,*]CLECOMTAB.DAT;*/DE
  >PIP LB:[1,2]CLE.HLP=CLE.HLP
  >INS CLE/TASK=...CLE
  >INS $DCL/TASK=...DCM    ! for <lf> command, comment see CLE.MAC
  >
  use CLE:
  -------
  >
  >CLE
  cle>
  .
  .
  cle>^Z
  >

  to start CLE in LOGIN.CMD use the command
  .XQT CLE
