Date: Thu 19 Sep 85 18:40:42-PDT
From: Ronald Blanford <CONTEXT@WASHINGTON.ARPA>
Subject: APC III Kermit
To: info-kermit-request@CU20B.ARPA

Frank,

Here is the MSXAPC3.ASM module for the APC III.  If something happens
to this in transmission, you can also ftp it from my account.

I have only used this briefly once, but as far as I can tell it does
not implement keyboard redefinition, does not implement any type of
terminal emulation, and only works with the standard serial port.  
Terminal mode does not have backward paging.

The author is RAL from Virginia Polytechnic Institute, more than that
I don't know.

-- Ron
