IKermit on the Vector 3 emulates a DEC VT52, with certain limitations.  ItJonly works well at speeds up to 1200 baud.  There doesn't seem to be a wayGto change the baud rate anyway.  Even at 1200 baud, it loses charactersGduring terminal emulation, after a carriage-return-linefeed sequence is?received during scrolling.  During terminal emulation, beeps doDnot sound.  Finally, the normal CONNECT-mode escape sequence lead-inHcharacter for the Vector is tilde because the original Vector model thatIthe program was written for had a tilde key, but was not able to transmitIthe more customary escape characters like ^] or Ctrl-Backslash.  However,Jthe Vector 3 does not even have a tilde key, so before issuing the CONNECTGcommand, you must SET ESCAPE to some character that you don't expect to type on the remote host, like #.Files:!KERMIT.COM is the Kermit program.:CP4KER.DOC is the CP/M-80 chapter of the Kermit User GuideACP4KER.BWR is the "beware" file, listing known bugs & limitations  of CP/M-80 Kermit..CP4KER.UPD is the edit history of the program.MCP4KER.HEX is the Intel hex format system-independent portion of the program.KCP4VEC.HEX is the Intel hex format Vector-dependent portion of the program.CP4VEC.HLP is this file.LHEXCHK.BAS is an EMBASIC program to check the validity of an Intel hex file.