Date: 23-JUN-1986 15:48:509From: SYSKERMIT%vax1.central.lancaster.ac.uk@Cs.Ucl.AC.UK+Subject: Hex file for Kermit-80 for TeletekMCP4TTK.HEX is for a Teletek CP/M-80 micro with an ADM 22 terminal.  It's fromLDavid Moore, Software Development, APV Automation, Fleming Way, Crawley RH10M2YX, UK. Telphone (UK) 0293-51890.  Source will probably be built into BertilSchou's 4.07 release.