JTo build C-Kermit for VMS, use the CKVKER.COM DCL procedure, which in turnCuses the CKVMAK.COM DCL procedure to compile each module that needsCcompiling.  CKVMAK.COM checks the creation date of the C source and?object files, skipping compilation if the object is up to date.ENote that it doesn't check header file dates, and thus cannot replace.the Unix make utility, or the Dec MMS product.FNote that sites that currently use Vax C, version 1 (on VMS Version 3)Fmay need to edit the definition of LNK$LIBRARY in CKVKER.COM, as noted/in the commentary at the beginning of the file.