 This program is to read the mag tape, space out the information and
 write out the information to a disk file


  The file name queried for in the program will cause that file to
   be opened and read for the following information: (by lines)

    1 - File name where the data from the mag tape is to be placed
    2 - Second line will contain the default punctuation, i.e. the
        periods & slashes
    3 - Contains the number of characters to print out to the file (1-80.)
    4 - Fourth line contains the starting location where the characters are
        to be moved from (1-80.)
    5 - Contains the location in the output buffer (1-132.)
    6 - Contains the number of characters to transfer from the input buffer
         to the output buffer (1-40.)
