HELP FOR COPYMT I/O ERROR OPTIONS
TYPE ONE OF:
C - COPY THIS RECORD (AS BEST AS POSSIBLE) AND CONTINUE
D - DUMP RECORD TO LPT:COPYMT.LPT AND ASK AGAIN
E - EXIT TO MONITOR (CONTINUE WILL ASK FOR OPTION)
G - "C" AND DON'T ASK FOR OPTIONS AGAIN IF ANY MORE ERRORS OCCUR
H - TYPE THIS
S - SKIP THIS RECORD (DON'T OUTPUT IT) AND CONTINUE

ANY OTHER RESPONSE IS TAKEN AS "H"
