TEK							24-Nov-82

  TEK is a program used to view a .PLT file on the TEKTRONIX or GIGI
graphics terminals.

  To view the file GRAPH.PLT, simply type
		.TEK GRAPH

  When TEK is finished, the plot file should be either erased by using
the DELETE command, or sent to the DP-8 plotter using the PLOT command.

[End of TEK.HLP]		See also the TEKVUE program
