	HELP File for University of Pennsylvania BASIC V-1

This version of BASIC was derived from DECSYSTEM-10 BASIC and
is upwards compatible with it. Users are referred to the
DECSYSTEM-10 BASIC Conservational Language Manual for a
description of the parent program, and to DOC:BASIC.MEM for
a description of the enhancements made to it.

	End of BASIC.HLP

